                                                                                                  Exp
                            Release                                                Filters/       Time Exp Start                                                   Archived
Row Prop ID Dataset   Class Date   Time Target                       Config  Mode  Gratings       (s)  Date   Time Exp Flag      RA (J2000)  Dec (J2000)  Aperture Date   Time Row
--- ------- --------- ----- ----------- ---------------------------- ------- ----- -------------- ---- ----------- ------------- ----------- ------------ -------- ----------- ---
  1 9583    J8DNB0030 CAL   021121 1432 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 0419 NORMAL        12 36 35.60 +62 07 29.35 WFCENTER 021122 0556   1
  2 9583    J8DNB0050 CAL   021121 1400 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 0444 NORMAL        12 36 35.61 +62 07 29.32 WFCENTER 021122 0509   2
  3 9583    J8DNB1030 CAL   021121 1506 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 0701 NORMAL        12 36 55.08 +62 09 45.48 WFCENTER 021122 0617   3
  4 9583    J8DNB1050 CAL   021121 1542 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 0726 NORMAL        12 36 55.09 +62 09 45.45 WFCENTER 021122 0730   4
  5 9583    J8DNB2030 CAL   021121 1722 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 1356 NORMAL        12 37 14.57 +62 12 01.61 WFCENTER 021122 0938   5
  6 9583    J8DNB2050 CAL   021122 0128 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 1421 NORMAL        12 37 14.58 +62 12 01.57 WFCENTER 021122 1101   6
  7 9583    J8DNB3030 CAL   021122 0138 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 1704 NORMAL        12 37 34.05 +62 14 17.74 WFCENTER 021122 1106   7
  8 9583    J8DNB3050 CAL   021122 0435 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 1729 NORMAL        12 37 34.06 +62 14 17.70 WFCENTER 021122 1244   8
  9 9583    J8DNB4030 CAL   021122 0359 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 1919 NORMAL        12 37 53.53 +62 16 33.86 WFCENTER 021122 1210   9
 10 9583    J8DNB4050 CAL   021122 0630 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 1956 NORMAL        12 37 53.54 +62 16 33.83 WFCENTER 021122 1337  10
 11 9583    J8DNB5030 CAL   021122 0640 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F775W;CLEAR2L  1120 021121 2153 NORMAL        12 36 15.91 +62 09 46.93 WFCENTER 021123 2208  11
 12 9583    J8DNB5050 CAL   021122 0927 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021121 2218 NORMAL        12 36 15.92 +62 09 46.89 WFCENTER 021123 2319  12
 13 9583    J8DNB6030 CAL   030220 1825 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F775W;CLEAR2L     0 021122 1920 EXCESSIVE DOW 12 36 35.40 +62 12 03.06 WFCENTER 030221 1742  13
 14 9583    J8DNB6050 CAL   030220 1907 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F850LP;CLEAR2L    0 021122 1957 EXCESSIVE DOW 12 36 35.40 +62 12 03.02 WFCENTER 030221 1914  14
 15 9583    J8DNB7030 CAL   021122 1138 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 0007 NORMAL        12 36 54.88 +62 14 19.18 WFCENTER 021124 0140  15
 16 9583    J8DNB7050 CAL   021122 1313 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 0044 NORMAL        12 36 54.89 +62 14 19.15 WFCENTER 021126 2045  16
 17 9583    J8DNB8030 CAL   021123 0837 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 2154 NORMAL        12 37 14.36 +62 16 35.31 WFCENTER 021124 2320  17
 18 9583    J8DNB8050 CAL   021123 1049 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 2219 NORMAL        12 37 14.37 +62 16 35.27 WFCENTER 021125 0026  18
 19 9583    J8DNB9030 CAL   021122 1707 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 0241 NORMAL        12 37 33.84 +62 18 51.44 WFCENTER 021205 0901  19
 20 9583    J8DNB9050 CAL   021122 1616 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 0306 NORMAL        12 37 33.85 +62 18 51.40 WFCENTER 021124 0555  20
 21 9583    J8DNC0030 CAL   021122 1605 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 0533 NORMAL        12 35 56.22 +62 12 04.51 WFCENTER 021205 0853  21
 22 9583    J8DNC0050 CAL   021122 1718 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 0558 NORMAL        12 35 56.23 +62 12 04.47 WFCENTER 021124 1932  22
 23 9583    J8DNC1030 CAL   021122 1810 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 0804 NORMAL        12 36 15.70 +62 14 20.63 WFCENTER 021124 1933  23
 24 9583    J8DNC1050 CAL   021122 1912 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 0856 NORMAL        12 36 15.71 +62 14 20.59 WFCENTER 021124 1938  24
 25 9583    J8DNC2030 CAL   021122 2032 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 1055 NORMAL        12 36 35.19 +62 16 36.76 WFCENTER 021124 2003  25
 26 9583    J8DNC2050 CAL   021122 2136 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 1120 NORMAL        12 36 35.20 +62 16 36.72 WFCENTER 021124 2043  26
 27 9583    J8DNC3030 CAL   021123 0037 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 1356 NORMAL        12 36 54.67 +62 18 52.88 WFCENTER 021124 2125  27
 28 9583    J8DNC3050 CAL   021123 0117 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 1421 NORMAL        12 36 54.68 +62 18 52.85 WFCENTER 021124 2205  28
 29 9583    J8DNC4030 CAL   021123 0149 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F775W;CLEAR2L  1120 021122 1706 NORMAL        12 37 14.15 +62 21 09.01 WFCENTER 021124 2217  29
 30 9583    J8DNC4050 CAL   021123 0355 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F850LP;CLEAR2L 2400 021122 1731 NORMAL        12 37 14.16 +62 21 08.97 WFCENTER 021124 2238  30
 31 9583    J8DNC5030 CAL   030102 1140 HDF-NORTH-GOODS-TILE-TILT-1  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 0444 NORMAL        12 36 18.12 +62 07 51.79 WFCENTER 030102 1155  31
 32 9583    J8DNC5050 CAL   030102 1424 HDF-NORTH-GOODS-TILE-TILT-1  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030102 0553 NORMAL        12 36 18.13 +62 07 51.81 WFCENTER 030102 1452  32
 33 9583    J8DNC6030 CAL   030102 1706 HDF-NORTH-GOODS-TILE-TILT-2  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 0920 NORMAL        12 36 45.82 +62 07 50.76 WFCENTER 030102 1818  33
 34 9583    J8DNC6050 CAL   030103 0058 HDF-NORTH-GOODS-TILE-TILT-2  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030102 1041 NORMAL        12 36 45.83 +62 07 50.78 WFCENTER 030103 0129  34
 35 9583    J8DNC7030 CAL   030102 2338 HDF-NORTH-GOODS-TILE-TILT-3  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 1354 NORMAL        12 35 55.60 +62 11 06.27 WFCENTER 030102 2357  35
 36 9583    J8DNC7050 CAL   030103 0617 HDF-NORTH-GOODS-TILE-TILT-3  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030102 1416 NORMAL        12 35 55.61 +62 11 06.29 WFCENTER 030103 0811  36
 37 9583    J8DNC8030 CAL   030105 0121 HDF-NORTH-GOODS-TILE-TILT-4  ACS/WFC ACCUM F775W;CLEAR2L  1000 030104 1545 NORMAL        12 36 23.29 +62 11 05.25 WFCENTER 030105 0216  37
 38 9583    J8DNC8050 CAL   030105 1306 HDF-NORTH-GOODS-TILE-TILT-4  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030104 1655 NORMAL        12 36 23.30 +62 11 05.27 WFCENTER 030105 1334  38
 39 9583    J8DNC9030 CAL   030103 0541 HDF-NORTH-GOODS-TILE-TILT-5  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 1720 NORMAL        12 36 50.99 +62 11 04.22 WFCENTER 030103 0725  39
 40 9583    J8DNC9050 CAL   030103 0902 HDF-NORTH-GOODS-TILE-TILT-5  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030102 1831 NORMAL        12 36 51.00 +62 11 04.25 WFCENTER 030103 1039  40
 41 9583    J8DND0030 CAL   030103 1531 HDF-NORTH-GOODS-TILE-TILT-6  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 2032 NORMAL        12 37 18.68 +62 11 03.20 WFCENTER 030103 1549  41
 42 9583    J8DND0050 CAL   030103 1619 HDF-NORTH-GOODS-TILE-TILT-6  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030102 2143 NORMAL        12 37 18.69 +62 11 03.22 WFCENTER 030103 1644  42
 43 9583    J8DND1030 CAL   030103 0941 HDF-NORTH-GOODS-TILE-TILT-7  ACS/WFC ACCUM F775W;CLEAR2L  1000 030102 2344 NORMAL        12 36 13.20 +62 14 19.12 WFCENTER 030103 1100  43
 44 9583    J8DND1050 CAL   030103 1102 HDF-NORTH-GOODS-TILE-TILT-7  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 0055 NORMAL        12 36 13.21 +62 14 19.15 WFCENTER 030103 1147  44
 45 9583    J8DND2030 CAL   030103 1130 HDF-NORTH-GOODS-TILE-TILT-8  ACS/WFC ACCUM F775W;CLEAR2L  1000 030103 0256 NORMAL        12 36 40.89 +62 14 18.10 WFCENTER 030103 1200  45
 46 9583    J8DND2050 CAL   030103 1240 HDF-NORTH-GOODS-TILE-TILT-8  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 0407 NORMAL        12 36 40.90 +62 14 18.12 WFCENTER 030103 1354  46
 47 9583    J8DND3030 CAL   030103 1636 HDF-NORTH-GOODS-TILE-TILT-9  ACS/WFC ACCUM F775W;CLEAR2L  1000 030103 0730 NORMAL        12 37 08.59 +62 14 17.08 WFCENTER 030103 1700  47
 48 9583    J8DND3050 CAL   030103 1537 HDF-NORTH-GOODS-TILE-TILT-9  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 0855 NORMAL        12 37 08.60 +62 14 17.10 WFCENTER 030103 1610  48
 49 9583    J8DND4030 CAL   030103 1829 HDF-NORTH-GOODS-TILE-TILT-10 ACS/WFC ACCUM F775W;CLEAR2L  1000 030103 1219 NORMAL        12 37 36.28 +62 14 16.05 WFCENTER 030103 1849  49
 50 9583    J8DND4050 CAL   030103 2110 HDF-NORTH-GOODS-TILE-TILT-10 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 1241 NORMAL        12 37 36.29 +62 14 16.07 WFCENTER 030103 2142  50
 51 9583    J8DND5030 CAL   030105 0339 HDF-NORTH-GOODS-TILE-TILT-11 ACS/WFC ACCUM F775W;CLEAR2L  1060 030104 2219 NORMAL        12 36 31.17 +62 17 32.10 WFCENTER 030105 0409  51
 52 9583    J8DND5050 CAL   030105 1855 HDF-NORTH-GOODS-TILE-TILT-11 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030104 2331 NORMAL        12 36 31.18 +62 17 32.12 WFCENTER 030105 1922  52
 53 9583    J8DND6030 CAL   030103 2336 HDF-NORTH-GOODS-TILE-TILT-12 ACS/WFC ACCUM F775W;CLEAR2L  1000 030103 1545 NORMAL        12 36 58.86 +62 17 31.07 WFCENTER 030106 1235  53
 54 9583    J8DND6050 CAL   030104 0615 HDF-NORTH-GOODS-TILE-TILT-12 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 1655 NORMAL        12 36 58.87 +62 17 31.09 WFCENTER 030106 1602  54
 55 9583    J8DND7030 CAL   030104 0645 HDF-NORTH-GOODS-TILE-TILT-13 ACS/WFC ACCUM F775W;CLEAR2L  1000 030103 1857 NORMAL        12 37 26.58 +62 17 29.91 WFCENTER 030106 1315  55
 56 9583    J8DND7050 CAL   030104 1842 HDF-NORTH-GOODS-TILE-TILT-13 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030103 2008 NORMAL        12 37 26.59 +62 17 29.93 WFCENTER 030104 1952  56
 57 9583    J8DND8030 CAL   030104 1139 HDF-NORTH-GOODS-TILE-TILT-14 ACS/WFC ACCUM F775W;CLEAR2L  1000 030104 0308 NORMAL        12 37 54.27 +62 17 28.89 WFCENTER 030104 1242  57
 58 9583    J8DND8050 CAL   030104 1228 HDF-NORTH-GOODS-TILE-TILT-14 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030104 0419 NORMAL        12 37 54.28 +62 17 28.91 WFCENTER 030104 1324  58
 59 9583    J8DND9030 CAL   030104 1241 HDF-NORTH-GOODS-TILE-TILT-15 ACS/WFC ACCUM F775W;CLEAR2L  1000 030104 0856 NORMAL        12 37 05.44 +62 20 44.49 WFCENTER 030104 1338  59
 60 9583    J8DND9050 CAL   030104 1745 HDF-NORTH-GOODS-TILE-TILT-15 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030104 0918 NORMAL        12 37 05.45 +62 20 44.51 WFCENTER 030106 1345  60
 61 9583    J8DNE0030 CAL   030104 1805 HDF-NORTH-GOODS-TILE-TILT-16 ACS/WFC ACCUM F775W;CLEAR2L  1000 030104 1232 NORMAL        12 37 33.14 +62 20 43.46 WFCENTER 030104 1932  61
 62 9583    J8DNE0050 CAL   030105 0056 HDF-NORTH-GOODS-TILE-TILT-16 ACS/WFC ACCUM F850LP;CLEAR2L 2120 030104 1344 NORMAL        12 37 33.15 +62 20 43.48 WFCENTER 030105 0151  62
 63 9583    J8DNE1030 CAL   030222 1344 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F775W;CLEAR2L   960 030222 0046 NORMAL        12 36 35.59 +62 07 29.41 WFCENTER 030224 0059  63
 64 9583    J8DNE1050 CAL   030222 1452 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030222 0157 NORMAL        12 36 35.60 +62 07 29.48 WFCENTER 030224 0231  64
 65 9583    J8DNE2030 CAL   030222 0634 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F775W;CLEAR2L   960 030221 1808 NORMAL        12 36 55.08 +62 09 45.54 WFCENTER 030223 1737  65
 66 9583    J8DNE2050 CAL   030222 2146 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 1830 NORMAL        12 36 55.08 +62 09 45.61 WFCENTER 030225 1315  66
 67 9583    J8DNE3030 CAL   030222 2142 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F775W;CLEAR2L   960 030222 0850 NORMAL        12 37 14.56 +62 12 01.67 WFCENTER 030224 1616  67
 68 9583    J8DNE3050 CAL   030222 2230 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030222 1008 NORMAL        12 37 14.56 +62 12 01.73 WFCENTER 030224 1706  68
 69 9583    J8DNE4030 CAL   030222 0933 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F775W;CLEAR2L   960 030221 2134 NORMAL        12 37 34.04 +62 14 17.79 WFCENTER 030223 1914  69
 70 9583    J8DNE4050 CAL   030222 1113 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 2246 NORMAL        12 37 34.05 +62 14 17.86 WFCENTER 030223 2121  70
 71 9583    J8DNE5030 CAL   030224 0255 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F775W;CLEAR2L   960 030223 1934 NORMAL        12 37 53.53 +62 16 33.92 WFCENTER 030225 1954  71
 72 9583    J8DNE5050 CAL   030224 1435 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030223 1955 NORMAL        12 37 53.53 +62 16 33.99 WFCENTER 030225 2351  72
 73 9583    J8DNE6030 CAL   030222 2323 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F775W;CLEAR2L     0 030222 1310 EXCESSIVE DOW 12 36 15.90 +62 09 46.99 WFCENTER 030224 1819  73
 74 9583    J8DNE6050 CAL   030223 0308 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F850LP;CLEAR2L    0 030222 1331 EXCESSIVE DOW 12 36 15.91 +62 09 47.05 WFCENTER 030224 2000  74
 75 9583    J8DNE7030 CAL   030220 1255 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F775W;CLEAR2L   960 030220 0832 NORMAL        12 36 35.39 +62 12 03.12 WFCENTER 030221 1419  75
 76 9583    J8DNE7050 CAL   030220 1619 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030220 0958 NORMAL        12 36 35.39 +62 12 03.18 WFCENTER 030221 1528  76
 77 9583    J8DNE8030 CAL   030220 1645 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F775W;CLEAR2L   960 030220 1310 NORMAL        12 36 54.87 +62 14 19.24 WFCENTER 030223 1431  77
 78 9583    J8DNE8050 CAL   030221 0206 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030220 1331 NORMAL        12 36 54.87 +62 14 19.31 WFCENTER 030222 0506  78
 79 9583    J8DNE9030 CAL   030221 0256 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F775W;CLEAR2L   960 030220 1632 NORMAL        12 37 14.35 +62 16 35.37 WFCENTER 030222 0643  79
 80 9583    J8DNE9050 CAL   030221 0402 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030220 1654 NORMAL        12 37 14.36 +62 16 35.43 WFCENTER 030222 1137  80
 81 9583    J8DNF0030 CAL   030221 0439 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F775W;CLEAR2L   960 030220 1957 NORMAL        12 37 33.84 +62 18 51.50 WFCENTER 030222 1326  81
 82 9583    J8DNF0050 CAL   030221 0522 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030220 2110 NORMAL        12 37 33.84 +62 18 51.56 WFCENTER 030222 1503  82
 83 9583    J8DNF1030 CAL   030222 1504 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F775W;CLEAR2L   960 030222 0358 NORMAL        12 35 56.21 +62 12 04.57 WFCENTER 030224 0239  83
 84 9583    J8DNF1050 CAL   030222 2025 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030222 0509 NORMAL        12 35 56.22 +62 12 04.63 WFCENTER 030224 0919  84
 85 9583    J8DNF2030 CAL   030221 0647 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F775W;CLEAR2L   960 030220 2309 NORMAL        12 36 15.69 +62 14 20.69 WFCENTER 030222 1750  85
 86 9583    J8DNF2050 CAL   030221 0743 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 0021 NORMAL        12 36 15.70 +62 14 20.75 WFCENTER 030222 2219  86
 87 9583    J8DNF3030 CAL   030221 1230 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F775W;CLEAR2L   960 030221 0221 NORMAL        12 36 35.18 +62 16 36.82 WFCENTER 030223 1449  87
 88 9583    J8DNF3050 CAL   030221 2235 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 0333 NORMAL        12 36 35.18 +62 16 36.88 WFCENTER 030223 0744  88
 89 9583    J8DNF4030 CAL   030221 2305 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F775W;CLEAR2L   960 030221 0533 NORMAL        12 36 54.66 +62 18 52.94 WFCENTER 030223 1001  89
 90 9583    J8DNF4050 CAL   030222 0014 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 0656 NORMAL        12 36 54.67 +62 18 53.01 WFCENTER 030223 1130  90
 91 9583    J8DNF5030 CAL   030222 0055 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F775W;CLEAR2L   960 030221 1030 NORMAL        12 37 14.14 +62 21 09.07 WFCENTER 030223 1146  91
 92 9583    J8DNF5050 CAL   030222 0128 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 1144 NORMAL        12 37 14.15 +62 21 09.13 WFCENTER 030223 1226  92
 93 9583    J8DNF6030 CAL   030403 2052 HDF-NORTH-GOODS-TILE-TILT-1  ACS/WFC ACCUM F775W;CLEAR2L   960 030403 1110 NORMAL        12 36 18.11 +62 07 51.78 WFCENTER 030403 2115  93
 94 9583    J8DNF6050 CAL   030403 2306 HDF-NORTH-GOODS-TILE-TILT-1  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030403 1222 NORMAL        12 36 18.11 +62 07 51.85 WFCENTER 030403 2345  94
 95 9583    J8DNF7030 CAL   030405 0121 HDF-NORTH-GOODS-TILE-TILT-2  ACS/WFC ACCUM F775W;CLEAR2L   960 030403 1422 NORMAL        12 36 45.81 +62 07 50.76 WFCENTER 030405 0400  95
 96 9583    J8DNF7050 CAL   030404 2348 HDF-NORTH-GOODS-TILE-TILT-2  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030403 1534 NORMAL        12 36 45.80 +62 07 50.83 WFCENTER 030405 0258  96
 97 9583    J8DNF8030 CAL   030405 0346 HDF-NORTH-GOODS-TILE-TILT-3  ACS/WFC ACCUM F775W;CLEAR2L   960 030403 1734 NORMAL        12 35 55.58 +62 11 06.27 WFCENTER 030405 0753  97
 98 9583    J8DNF8050 CAL   030405 0127 HDF-NORTH-GOODS-TILE-TILT-3  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030403 1846 NORMAL        12 35 55.58 +62 11 06.34 WFCENTER 030405 0530  98
 99 9583    J8DNF9030 CAL   030105 1330 HDF-NORTH-GOODS-TILE-TILT-4  ACS/WFC ACCUM F775W;CLEAR2L  1000 030104 1857 NORMAL        12 36 23.72 +62 11 05.38 WFCENTER 030105 1344  99
100 9583    J8DNF9050 CAL   030105 1412 HDF-NORTH-GOODS-TILE-TILT-4  ACS/WFC ACCUM F850LP;CLEAR2L 2120 030104 2007 NORMAL        12 36 23.73 +62 11 05.40 WFCENTER 030105 1439 100
101 9583    J8DNG0030 CAL   030404 2043 HDF-NORTH-GOODS-TILE-TILT-5  ACS/WFC ACCUM F775W;CLEAR2L   960 030404 1110 NORMAL        12 36 50.98 +62 11 04.22 WFCENTER 030404 2119 101
102 9583    J8DNG0050 CAL   030405 0301 HDF-NORTH-GOODS-TILE-TILT-5  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030404 1222 NORMAL        12 36 50.97 +62 11 04.29 WFCENTER 030405 0719 102
103 9583    J8DNG1030 CAL   030405 0444 HDF-NORTH-GOODS-TILE-TILT-6  ACS/WFC ACCUM F775W;CLEAR2L   960 030404 1422 NORMAL        12 37 18.67 +62 11 03.20 WFCENTER 030405 0915 103
104 9583    J8DNG1050 CAL   030405 0533 HDF-NORTH-GOODS-TILE-TILT-6  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030404 1534 NORMAL        12 37 18.67 +62 11 03.27 WFCENTER 030405 0947 104
105 9583    J8DNG2030 CAL   030405 0622 HDF-NORTH-GOODS-TILE-TILT-7  ACS/WFC ACCUM F775W;CLEAR2L   960 030404 1734 NORMAL        12 36 13.18 +62 14 19.12 WFCENTER 030405 1336 105
106 9583    J8DNG2050 CAL   030405 0709 HDF-NORTH-GOODS-TILE-TILT-7  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030404 1846 NORMAL        12 36 13.18 +62 14 19.19 WFCENTER 030405 1607 106
107 9583    J8DNG3030 CAL   030405 1638 HDF-NORTH-GOODS-TILE-TILT-8  ACS/WFC ACCUM F775W;CLEAR2L   960 030405 1110 NORMAL        12 36 40.88 +62 14 18.10 WFCENTER 030405 2030 107
108 9583    J8DNG3050 CAL   030405 1727 HDF-NORTH-GOODS-TILE-TILT-8  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030405 1222 NORMAL        12 36 40.88 +62 14 18.17 WFCENTER 030405 2101 108
109 9583    J8DNG4030 CAL   030405 2331 HDF-NORTH-GOODS-TILE-TILT-9  ACS/WFC ACCUM F775W;CLEAR2L   960 030405 1422 NORMAL        12 37 08.57 +62 14 17.07 WFCENTER 030405 2359 109
110 9583    J8DNG4050 CAL   030406 0204 HDF-NORTH-GOODS-TILE-TILT-9  ACS/WFC ACCUM F850LP;CLEAR2L 2000 030405 1535 NORMAL        12 37 08.57 +62 14 17.14 WFCENTER 030406 0259 110
111 9583    J8DNG5030 CAL   030406 1558 HDF-NORTH-GOODS-TILE-TILT-10 ACS/WFC ACCUM F775W;CLEAR2L   960 030406 0934 NORMAL        12 37 36.27 +62 14 16.05 WFCENTER 030407 1959 111
112 9583    J8DNG5050 CAL   030407 0153 HDF-NORTH-GOODS-TILE-TILT-10 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030406 1047 NORMAL        12 37 36.27 +62 14 16.12 WFCENTER 030408 0027 112
113 9583    J8DNG6030 CAL   030407 0333 HDF-NORTH-GOODS-TILE-TILT-11 ACS/WFC ACCUM F775W;CLEAR2L   960 030406 1246 NORMAL        12 36 31.15 +62 17 32.10 WFCENTER 030408 0053 113
114 9583    J8DNG6050 CAL   030407 0402 HDF-NORTH-GOODS-TILE-TILT-11 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030406 1359 NORMAL        12 36 31.15 +62 17 32.17 WFCENTER 030408 0107 114
115 9583    J8DNG7030 CAL   030407 0542 HDF-NORTH-GOODS-TILE-TILT-12 ACS/WFC ACCUM F775W;CLEAR2L   960 030406 1558 NORMAL        12 36 58.85 +62 17 31.07 WFCENTER 030408 0131 115
116 9583    J8DNG7050 CAL   030407 1421 HDF-NORTH-GOODS-TILE-TILT-12 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030406 1711 NORMAL        12 36 58.85 +62 17 31.14 WFCENTER 030408 0345 116
117 9583    J8DNG8030 CAL   030404 0839 HDF-NORTH-GOODS-TILE-TILT-13 ACS/WFC ACCUM F775W;CLEAR2L   960 030404 0446 NORMAL        12 37 26.57 +62 17 29.91 WFCENTER 030404 1548 117
118 9583    J8DNG8050 CAL   030404 2001 HDF-NORTH-GOODS-TILE-TILT-13 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030404 0558 NORMAL        12 37 26.56 +62 17 29.98 WFCENTER 030404 2037 118
119 9583    J8DNG9030 CAL   030404 1333 HDF-NORTH-GOODS-TILE-TILT-14 ACS/WFC ACCUM F775W;CLEAR2L   960 030404 0758 NORMAL        12 37 54.26 +62 17 28.88 WFCENTER 030404 1656 119
120 9583    J8DNG9050 CAL   030405 0647 HDF-NORTH-GOODS-TILE-TILT-14 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030404 0910 NORMAL        12 37 54.26 +62 17 28.96 WFCENTER 030405 1406 120
121 9583    J8DNH0030 CAL   030405 0938 HDF-NORTH-GOODS-TILE-TILT-15 ACS/WFC ACCUM F775W;CLEAR2L   960 030405 0321 NORMAL        12 37 05.43 +62 20 44.48 WFCENTER 030405 1721 121
122 9583    J8DNH0050 CAL   030405 1008 HDF-NORTH-GOODS-TILE-TILT-15 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030405 0433 NORMAL        12 37 05.43 +62 20 44.55 WFCENTER 030405 1752 122
123 9583    J8DNH1030 CAL   030405 1218 HDF-NORTH-GOODS-TILE-TILT-16 ACS/WFC ACCUM F775W;CLEAR2L   960 030405 0735 NORMAL        12 37 33.12 +62 20 43.46 WFCENTER 030405 1850 123
124 9583    J8DNH1050 CAL   030405 1519 HDF-NORTH-GOODS-TILE-TILT-16 ACS/WFC ACCUM F850LP;CLEAR2L 2000 030405 0756 NORMAL        12 37 33.12 +62 20 43.53 WFCENTER 030405 1953 124
125 9583    J8DNH2030 CAL   030525 1224 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F775W;CLEAR2L   960 030525 0649 NORMAL        12 36 35.58 +62 07 29.35 WFCENTER 030525 1248 125
126 9583    J8DNH2050 CAL   030525 1308 HDF-NORTH-GOODS-TILE-NORM-1  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030525 0711 NORMAL        12 36 35.57 +62 07 29.39 WFCENTER 030525 1323 126
127 9583    J8DNH3030 CAL   030521 1619 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F775W;CLEAR2L   960 030521 1127 NORMAL        12 36 55.07 +62 09 45.48 WFCENTER 030522 0447 127
128 9583    J8DNH3050 CAL   030521 1855 HDF-NORTH-GOODS-TILE-NORM-2  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030521 1149 NORMAL        12 36 55.06 +62 09 45.51 WFCENTER 030522 0533 128
129 9583    J8DNH4030 CAL   030524 1746 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F775W;CLEAR2L   960 030524 1151 NORMAL        12 37 14.55 +62 12 01.60 WFCENTER 030524 2052 129
130 9583    J8DNH4050 CAL   030524 1902 HDF-NORTH-GOODS-TILE-NORM-3  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030524 1303 NORMAL        12 37 14.54 +62 12 01.64 WFCENTER 030524 2053 130
131 9583    J8DNH5030 CAL   030524 2018 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F775W;CLEAR2L   960 030524 1503 NORMAL        12 37 34.03 +62 14 17.73 WFCENTER 030524 2055 131
132 9583    J8DNH5050 CAL   030525 0333 HDF-NORTH-GOODS-TILE-NORM-4  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030524 1615 NORMAL        12 37 34.02 +62 14 17.77 WFCENTER 030525 0353 132
133 9583    J8DNH6030 CAL   030521 1804 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F775W;CLEAR2L   960 030521 1450 NORMAL        12 37 53.52 +62 16 33.86 WFCENTER 030522 0515 133
134 9583    J8DNH6050 CAL   030522 0023 HDF-NORTH-GOODS-TILE-NORM-5  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030521 1512 NORMAL        12 37 53.51 +62 16 33.89 WFCENTER 030522 0618 134
135 9583    J8DNH7030 CAL   030222 0348 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F775W;CLEAR2L   960 030221 1446 NORMAL        12 36 16.19 +62 09 49.20 WFCENTER 030223 1533 135
136 9583    J8DNH7050 CAL   030222 0526 HDF-NORTH-GOODS-TILE-NORM-6  ACS/WFC ACCUM F850LP;CLEAR2L 2060 030221 1507 NORMAL        12 36 16.20 +62 09 49.26 WFCENTER 030223 1615 136
137 9583    J8DNH8030 CAL   030522 0205 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F775W;CLEAR2L   960 030521 1825 NORMAL        12 36 35.38 +62 12 03.05 WFCENTER 030522 0642 137
138 9583    J8DNH8050 CAL   030522 0655 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030521 1944 NORMAL        12 36 35.37 +62 12 03.09 WFCENTER 030522 0804 138
139 9583    J8DNH9030 CAL   030525 1452 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F775W;CLEAR2L   960 030525 1017 NORMAL        12 36 54.86 +62 14 19.18 WFCENTER 030525 1506 139
140 9583    J8DNH9050 CAL   030525 1633 HDF-NORTH-GOODS-TILE-NORM-8  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030525 1127 NORMAL        12 36 54.85 +62 14 19.21 WFCENTER 030525 1652 140
141 9583    J8DNI0030 CAL   030525 1742 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F775W;CLEAR2L   960 030525 1329 NORMAL        12 37 14.34 +62 16 35.30 WFCENTER 030525 1753 141
142 9583    J8DNI0050 CAL   030525 2337 HDF-NORTH-GOODS-TILE-NORM-9  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030525 1439 NORMAL        12 37 14.33 +62 16 35.34 WFCENTER 030525 2353 142
143 9583    J8DNI1030 CAL   030523 0035 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F775W;CLEAR2L   960 030522 1513 NORMAL        12 37 33.83 +62 18 51.43 WFCENTER 030523 0054 143
144 9583    J8DNI1050 CAL   030523 0427 HDF-NORTH-GOODS-TILE-NORM-10 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030522 1626 NORMAL        12 37 33.82 +62 18 51.47 WFCENTER 030523 1246 144
145 9583    J8DNI2030 CAL   030526 0017 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F775W;CLEAR2L   960 030525 1641 NORMAL        12 35 56.20 +62 12 04.50 WFCENTER 030526 0030 145
146 9583    J8DNI2050 CAL   030526 0051 HDF-NORTH-GOODS-TILE-NORM-11 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030525 1753 NORMAL        12 35 56.19 +62 12 04.54 WFCENTER 030526 0108 146
147 9583    J8DNI3030 CAL   030523 2013 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F775W;CLEAR2L   960 030523 1002 NORMAL        12 36 15.69 +62 14 20.62 WFCENTER 030523 2051 147
148 9583    J8DNI3050 CAL   030524 0019 HDF-NORTH-GOODS-TILE-NORM-12 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030523 1023 NORMAL        12 36 15.68 +62 14 20.66 WFCENTER 030524 0049 148
149 9583    J8DNI4030 CAL   030526 0136 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F775W;CLEAR2L   960 030525 1953 NORMAL        12 36 35.17 +62 16 36.75 WFCENTER 030526 0148 149
150 9583    J8DNI4050 CAL   030526 0242 HDF-NORTH-GOODS-TILE-NORM-13 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030525 2103 NORMAL        12 36 35.16 +62 16 36.79 WFCENTER 030526 0300 150
151 9583    J8DNI5030 CAL   030523 2107 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F775W;CLEAR2L   960 030523 1327 NORMAL        12 36 54.65 +62 18 52.88 WFCENTER 030523 2130 151
152 9583    J8DNI5050 CAL   030524 0414 HDF-NORTH-GOODS-TILE-NORM-14 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030523 1439 NORMAL        12 36 54.64 +62 18 52.91 WFCENTER 030524 0456 152
153 9583    J8DNI6030 CAL   030524 0502 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F775W;CLEAR2L   960 030523 1639 NORMAL        12 37 14.14 +62 21 09.00 WFCENTER 030524 0555 153
154 9583    J8DNI6050 CAL   030524 0603 HDF-NORTH-GOODS-TILE-NORM-15 ACS/WFC ACCUM F850LP;CLEAR2L 2080 030523 1754 NORMAL        12 37 14.13 +62 21 09.04 WFCENTER 030524 0646 154
155 9583    J8DNJ2030 CAL   030524 1453 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F775W;CLEAR2L   960 030524 0826 NORMAL        12 36 35.38 +62 12 03.05 WFCENTER 030524 1750 155
156 9583    J8DNJ2050 CAL   030524 1716 HDF-NORTH-GOODS-TILE-NORM-7  ACS/WFC ACCUM F850LP;CLEAR2L 2080 030524 0847 NORMAL        12 36 35.37 +62 12 03.09 WFCENTER 030527 1115 156

Feb 11, 04 12:35 Page 1/1

hstgoodsarchive.lst

Printed by Rachel Gibbons

Wednesday February 11, 2004 1/1