5 years CFHLS + 200 nearby

-1 -0.95

-0.9

-0.85

-0.8

-0.75

-0.7

-0.65

-0.6

-0.55

-0.5

0 0.1 0.2 0.3 0.4 0.5

Ω_M w

-1 -0.95

-0.9

-0.85

-0.8

-0.75

-0.7

-0.65

-0.6

-0.55

-0.5

0 0.1 0.2 0.3 0.4 0.5

Ω_M w

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

0 0.1 0.2 0.3 0.4 0.5

Ω_M

Ω_Λ

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

0 0.1 0.2 0.3 0.4 0.5

Ω_M

Ω_Λ