Status Summary of Candiates

Object Previous info Keck Spectrum Comments Plots^� Host SN features

SN1 z = 0.26 best fit to z = 0.374 (3rd d.pl ?) � host1 call.ps light curve H, K absorption superposition host: z = 0.373 likely Hα emission of galaxies ? -WHT

SN2 z = 0.45 best fit to z = 0.42 � host2.ps light curve H, K absorption

SN3 z = 0.354 from

SN spectum

SN5 z = 0.37 cluster z

host z = 0.372 -WHT

SN6 z = 0.43 SN spectrum

SN16 host z = 0.578 WHT host z = 0.578 possibly z consistent sn16.ps but very unsure OII & Hβ emission consistent with with light curve host16.ps Ia at day ¸ 17 sn16 light.ps

AGN2 host z = 0.378 clear type Ia agn2.ps OIII, Hβ, Hα emission features at host agn2.ps H, K absorption z = 0.378 Si feature visible

Cetus R light-curve spectrum pending cetus light.ps suggests z ¸ 0.6

SN19 host z = 0.134 ?? none visible photometry not flat-fielding consistent with problem ? Ia light curve

* in /home/astro10/imh/spectra/ also available on Mosaic