Figure 1: B-I for the two sets of data. The solid line represent alway the curve found for the current set, while the dashed line is the curve found for the same colour of the other set.

Figure 2: Residuals of each of the models from the one builded for all the data set.

xbin N_k BV^k BVintr dBVintr 0.0 63. -0.118 ± 0.019 0.087 0.007 5.0 75. 0.012 ± 0.012 0.096 0.009 10.0 82. 0.144 ± 0.020 0.108 0.008 15.0 66. 0.437 ± 0.057 0.111 0.012 20.0 49. 0.718 ± 0.106 0.130 0.014 25.0 41. 0.934 ± 0.149 0.102 0.014 30.0 38. 1.058 ± 0.175 0.107 0.015 xbin N_k V R^k VRintr dVRintr 0.0 36. -0.015 ± 0.009 0.054 0.006 5.0 41. -0.038 ± 0.013 0.073 0.008 10.0 44. -0.119 ± 0.020 0.050 0.006 15.0 41. -0.094 ± 0.025 0.127 0.041 20.0 26. 0.057 ± 0.020 0.070 0.010 25.0 23. 0.184 ± 0.041 0.060 0.009 30.0 22. 0.279 ± 0.062 0.066 0.016 xbin N_k RI^k RIintr dRIintr 0.0 35. -0.458 ± 0.081 0.113 0.011 5.0 41. -0.521 ± 0.084 0.089 0.008 10.0 37. -0.482 ± 0.082 0.098 0.010 15.0 37. -0.240 ± 0.054 0.201 0.042 20.0 22. -0.014 ± 0.031 0.141 0.018 25.0 23. 0.098 ± 0.026 0.075 0.009 30.0 21. 0.223 ± 0.055 0.095 0.013 xbin N_k BI^k BIintr dBIintr 0.0 46. -0.594 ± 0.090 0.133 0.017 5.0 54. -0.575 ± 0.082 0.160 0.023 10.0 53. -0.480 ± 0.070 0.156 0.013 15.0 42. 0.073 ± 0.044 0.207 0.031 20.0 36. 0.721 ± 0.132 0.239 0.038 25.0 26. 1.203 ± 0.245 0.212 0.029 30.0 29. 1.590 ± 0.302 0.157 0.019 xbin N_k V I^k VIintr dVIintr 0.0 44. -0.477 ± 0.074 0.096 0.012 5.0 56. -0.587 ± 0.081 0.109 0.010 10.0 53. -0.610 ± 0.086 0.109 0.010 15.0 44. -0.334 ± 0.058 0.160 0.015 20.0 38. 0.028 ± 0.031 0.160 0.018 25.0 29. 0.308 ± 0.065 0.151 0.022 30.0 31. 0.515 ± 0.098 0.135 0.017

Table 1: Results of the analysis of all SNe. xbin is the central value in days for each bin; N_k is the number of points for each bin; XY^k is the weighted mean value and its uncertainty; (XY )_{intr} is computed as the square root of the weighted standard deviation.

B-V 0 7 15 22 30 0 1.00 0.80^{+0.08}_{−0.13} 0.61^{+0.15}_{−0.21} 0.52^{+0.18}_{−0.24} 0.43^{+0.20}_{−0.26} 7 1.00 0.76^{+0.10}_{−0.15} 0.73^{+0.11}_{−0.17} 0.57^{+0.16}_{−0.23} 15 1.00 0.65^{+0.14}_{−0.20} 0.32^{+0.23}_{−0.28} 22 1.00 0.47^{+0.19}_{−0.25} 30 1.00 V-R 0 7 15 22 30 0 1.00 0.70^{+0.17}_{−0.30} 0.42^{+0.29}_{−0.42} −0.05^{+0.43}_{−0.41} 0.25^{+0.36}_{−0.44} 7 1.00 0.23^{+0.36}_{−0.44} 0.36^{+0.32}_{−0.43} 0.18^{+0.38}_{−0.44} 15 1.00 0.58^{+0.22}_{−0.37} 0.34^{+0.32}_{−0.43} 22 1.00 0.03^{+0.41}_{−0.42} 30 1.00 R-I 0 7 15 22 30 0 1.00 0.75^{+0.15}_{−0.31} 0.61^{+0.23}_{−0.40} 0.57^{+0.25}_{−0.42} 0.43^{+0.32}_{−0.47} 7 1.00 0.92^{+0.05}_{−0.12} 0.84^{+0.10}_{−0.22} 0.71^{+0.17}_{−0.34} 15 1.00 0.88^{+0.07}_{−0.17} 0.76^{+0.15}_{−0.30} 22 1.00 0.88^{+0.07}_{−0.17} 30 1.00 V-I 0 7 15 22 30 0 1.00 0.83^{+0.08}_{−0.15} 0.81^{+0.09}_{−0.16} 0.80^{+0.10}_{−0.17} 0.56^{+0.20}_{−0.29} 7 1.00 0.81^{+0.09}_{−0.16} 0.79^{+0.10}_{−0.17} 0.66^{+0.16}_{−0.25} 15 1.00 0.90^{+0.05}_{−0.09} 0.59^{+0.19}_{−0.28} 22 1.00 0.66^{+0.16}_{−0.25} 30 1.00 B-I 0 7 15 22 30 0 1.00 0.35^{+0.28}_{−0.36} 0.39^{+0.27}_{−0.36} 0.19^{+0.32}_{−0.37} 0.14^{+0.34}_{−0.37} 7 1.00 0.65^{+0.17}_{−0.27} 0.38^{+0.27}_{−0.36} 0.43^{+0.25}_{−0.35} 15 1.00 0.73^{+0.13}_{−0.23} 0.29^{+0.30}_{−0.37} 22 1.00 0.55^{+0.21}_{−0.31} 30 1.00

Table 2: Correlation coefficients between the different bins. The indicated xbin is the central value of each bin. The bin size is 7 days for all the bins. The errors indicate the 1 σ confidence level for the computed coefficients.