=1 XΩ+_MΩ

Year st SNLS 1

BAO (SDSS)

99,7 % 95 % 68 %

MΩ 0 0.1 0.2 0.3 0.4 0.5 0.6 w

-2 -1.8

-1.6

-1.4

-1.2 -1 -0.8

-0.6

-0.4